IDEMIMAR_HATCH_FILE
DUVAR
DEFAULT_SCALE
1
LINE
0
0
0
1
LINE
0.1
0
0.1
1
LINE
0.5
0
0.5
1
LINE
0.6
0
0.6
1
LINE
0
0.9
0.1
1
LINE
0.1
1
0.5
1
LINE
0.5
1
0.6
0.9
LINE
0.6
0.9
1
0.9
